%        File: labels_1x2-5/8.ltx
%     Created:  Tue 5 Feb 2016
% Last Change:      5 Feb 2016
%
%  -> For Avery #8160 labels (1x2 5/8", 10x3 array on sheet)
%
%	mkdraft for frames around labels.
%	
%	Be sure to toggle \hoffset depending on printer.

\documentclass[10pt]{article}
\usepackage{geometry}
    \geometry{
	hmargin=0.20in,
	vmargin=0.50in,
	nohead,
	nofoot,
    }
\pagestyle{empty}

\tabcolsep=0pt
\renewcommand{\arraystretch}{0}


\newcommand{\plate}[1]	{
%  \frame{								%#d
    \def\name{#1}
    \parbox[t][1in]{2.430 in}{% 2-7/16"
      \ifx \name \placeholder \hfil \else
      {\centering
        \vfill
	#1
        \vfill
	\par }%
      \fi
  }}%
%  }%									%#d

\def\placeholder{ZZZ}

\begin{document}

%\hoffset= -0.122in%	for Canon Copier
\hoffset= -0.063in%	for Dell		--> Remember to Rotate Paper

%	 \plate{ZZZ} will be left blank in output
%
\begin{tabular} {@{}l*{2}{@{\hspace{0.288in}}l}}		 		 

 % row 1
    \plate{ZZZ} &
    \plate{Henry Fonclbricsh} &
    \plate{abcd} \\

 % row 2
    \plate{abcd} &
    \plate{abcd} &
    \plate{abcd} \\

 % row 3
    \plate{ZZZ} &
    \plate{ZZZ} &
    \plate{ZZZ} \\

 % row 4
    \plate{ZZZ} &
    \plate{ZZZ} &
    \plate{ZZZ} \\

 % row 5
    \plate{ZZZ} &
    \plate{ZZZ} &
    \plate{ZZZ} \\

 % row 6
    \plate{ZZZ} &
    \plate{ZZZ} &
    \plate{ZZZ} \\

 % row 7
    \plate{ZZZ} &
    \plate{ZZZ} &
    \plate{ZZZ} \\

 % row 8
    \plate{ZZZ} &
    \plate{ZZZ} &
    \plate{ZZZ} \\

 % row 8
    \plate{ZZZ} &
    \plate{ZZZ} &
    \plate{ZZZ} \\

 % row 10
    \plate{ZZZ} &
    \plate{ZZZ} &
    \plate{ZZZ} \\

\end{tabular}
\end{document}
